\pagebreak
\chapter{The \code{omp\_init\_lock} Routine}
\label{chap:init_lock}

The following example demonstrates how to initialize an array of locks in a \code{parallel} 
region by using \code{omp\_init\_lock}.

\cexample{init_lock}{1c}

\fexample{init_lock}{1f}

