\subsection{Nestable Lock Routines}
\label{subsec:nestable_lock}

\index{nestable lock}
The following example demonstrates how a nestable lock can be used to synchronize 
updates both to a whole structure and to one of its members.

\cexample{nestable_lock}{1}

\fexample{nestable_lock}{1}

